Copyright: ®1994 McAfee Associates,Inc.


Common Mail Dialog Box List

Address Dialog Box

Lotus VIM Sign On Dialog Box

MHS Sign On Dialog Box

Microsoft Mail Sign On Dialog Box


Address Dialog Box

Use this dialog box to select the users you want to receive mail.

Item	Description
Directory List	This is a list of all users of the EMail system. Double-click on the users you want to receive this message.
To	This is a list of the users you have selected from the Directory List. You can type in the EMail IDs of recipients. To remove a recipient from the list, select the recipient and press the [Delete] key.


Lotus VIM Sign On Dialog Box

Use this dialog box to sign on to Lotus cc:Mail.

Choose this...	To do this...
Mail ID	Enter your mail ID, which was assigned by your mail system administrator.
Password	Enter your password.
Path	Enter the path to the directory containing your mail (Post Office).


MHS Sign On Dialog Box

Use this dialog box to sign on to MHS.

Choose this...	To do this...
Path	Enter the path to the directory containing your mail.


Microsoft Mail Dialog Box
Microsoft Mail Sign On Dialog Box

Use this dialog box to sign on to Microsoft Mail.

Choose this...	To do this...
Mail ID	Enter your mail ID, which was assigned by your mail system administrator.
Password	Enter your password.